n gate fitting results MSE=0.17

-120 -90 -60 -30 0 30 Voltage (mV) 0

0.2

0.4

0.6

0.8

1 n_{ss}

HH BG

-120 -90 -60 -30 0 30 Voltage (mV) 0 1 2 3 4 5 6 n(ms)

-120 -90 -60 -30 0 30 Voltage (mV) 0

0.5

1

1.5

2

2.5 n(ms)

-120 -90 -60 -30 0 30 Voltage (mV) 0

0.05

0.1

0.15

0.2

0.25 n (ms)